en	Your password must be at least {{length}} characters long.
und	Password must be at least {{length}} characters long.

en	Your password must include at least one letter.
und	Password must include at least one letter.

en	Your password must include both upper and lower case letters.
und	Password must include both upper and lower case letters.

en	Your password must include at least one number.
und	Password must include at least one number.

en	Your password must contain at least one special character.
und	Password must contain at least one special character.

en	password_too_weak
und	Password needs to be at least at strength level "{{ min_strength }}", current level is "{{ current_strength }}", try the following: {{ strength_tips }}.

en	rollerworks_password.strength_level.very_weak
und	Very Weak

en	rollerworks_password.strength_level.weak
und	Weak

en	rollerworks_password.strength_level.medium
und	Medium

en	rollerworks_password.strength_level.strong
und	Strong

en	rollerworks_password.strength_level.very_strong
und	Very strong

en	rollerworks_password.tip.letters
und	add (upper/lowercase) letters

en	rollerworks_password.tip.numbers
und	add numbers

en	rollerworks_password.tip.lowercase_letters
und	add lowercase letters

en	rollerworks_password.tip.uppercase_letters
und	add uppercase letters

en	rollerworks_password.tip.special_chars
und	add special characters

en	rollerworks_password.tip.length
und	add more characters

en	This password was found in a database of compromised passwords. It has been used {{ used }} times. For security purposes you must use something else.